From 2a759ffd2f6a4cd692fcc333ac87fd8921a5c936 Mon Sep 17 00:00:00 2001
From: Marco Platania <platania@research.att.com>
Date: Fri, 16 Mar 2018 16:31:33 -0400
Subject: Add health check to vLBMS

- Add health check to VNF components for vLB manual scale out
- Update POM tree

Change-Id: Id348d0cb56adf052694c6e8682b499eb1ac24af1
Issue-ID: INT-433
Signed-off-by: Marco Platania <platania@research.att.com>
---
 .../vlb-business-vnf-onap-plugin-api/asciidoc/Readme.adoc              | 3 +++
 1 file changed, 3 insertions(+)
 create mode 100644 vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin/vlb-business-vnf-onap-plugin-api/asciidoc/Readme.adoc

(limited to 'vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin/vlb-business-vnf-onap-plugin-api/asciidoc/Readme.adoc')

diff --git a/vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin/vlb-business-vnf-onap-plugin-api/asciidoc/Readme.adoc b/vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin/vlb-business-vnf-onap-plugin-api/asciidoc/Readme.adoc
new file mode 100644
index 00000000..84ed862b
--- /dev/null
+++ b/vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin/vlb-business-vnf-onap-plugin-api/asciidoc/Readme.adoc
@@ -0,0 +1,3 @@
+= vlb-business-vnf-onap-plugin-api
+
+Overview of vlb-business-vnf-onap-plugin-api
\ No newline at end of file
-- 
cgit 1.2.3-korg

