From 2a759ffd2f6a4cd692fcc333ac87fd8921a5c936 Mon Sep 17 00:00:00 2001
From: Marco Platania <platania@research.att.com>
Date: Fri, 16 Mar 2018 16:31:33 -0400
Subject: Add health check to vLBMS

- Add health check to VNF components for vLB manual scale out
- Update POM tree

Change-Id: Id348d0cb56adf052694c6e8682b499eb1ac24af1
Issue-ID: INT-433
Signed-off-by: Marco Platania <platania@research.att.com>
---
 vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin-impl/asciidoc/Readme.adoc | 3 ---
 1 file changed, 3 deletions(-)
 delete mode 100644 vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin-impl/asciidoc/Readme.adoc

(limited to 'vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin-impl/asciidoc/Readme.adoc')

diff --git a/vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin-impl/asciidoc/Readme.adoc b/vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin-impl/asciidoc/Readme.adoc
deleted file mode 100644
index ab759c7b..00000000
--- a/vnfs/vLBMS/apis/vlb-business-vnf-onap-plugin-impl/asciidoc/Readme.adoc
+++ /dev/null
@@ -1,3 +0,0 @@
-= vlb-business-vnf-onap-plugin-impl
-
-Overview of vlb-business-vnf-onap-plugin-impl
\ No newline at end of file
-- 
cgit 

