From 149a1664fcb40e1ad83f48878a13d2aff0f65b75 Mon Sep 17 00:00:00 2001
From: Marco Platania <platania@research.att.com>
Date: Thu, 18 Apr 2019 18:02:47 -0400
Subject: Update Honeycomb to Rel1810 for vFW

- Update Honeycomb version to 1810 to support ODL Fluorine
- Migrate existing stream-count plugin to 1810
- Update POM structure
- Update vPacketGen install file (including ARM64)

Change-Id: I2866c80876550cb149cdb5fee3193d453643639c
Issue-ID: INT-1035
Signed-off-by: Marco Platania <platania@research.att.com>
---
 vnfs/honeycomb_plugin/stream-count/asciidoc/Readme.adoc | 3 +++
 1 file changed, 3 insertions(+)
 create mode 100644 vnfs/honeycomb_plugin/stream-count/asciidoc/Readme.adoc

(limited to 'vnfs/honeycomb_plugin/stream-count/asciidoc/Readme.adoc')

diff --git a/vnfs/honeycomb_plugin/stream-count/asciidoc/Readme.adoc b/vnfs/honeycomb_plugin/stream-count/asciidoc/Readme.adoc
new file mode 100644
index 00000000..648b59e3
--- /dev/null
+++ b/vnfs/honeycomb_plugin/stream-count/asciidoc/Readme.adoc
@@ -0,0 +1,3 @@
+= stream-count-aggregator
+
+Overview of stream-count-aggregator
\ No newline at end of file
-- 
cgit 1.2.3-korg

