From fe22688f495f4870d9bf40c5935461b5e845f9d9 Mon Sep 17 00:00:00 2001
From: danielhanrahan <daniel.hanrahan@est.tech>
Date: Fri, 23 Aug 2024 13:29:11 +0100
Subject: Support 2 CPS instances in Prometheus/Grafana

- Specify both cps-and-ncmp instances in Prometheus config
- Add default JVM Micrometer dashboard to Grafana, taken from
  https://grafana.com/grafana/dashboards/4701-jvm-micrometer/

Issue-ID: CPS-2314
Signed-off-by: danielhanrahan <daniel.hanrahan@est.tech>
Change-Id: I24a42b8b4771a7d9341e920fbd85fa72e1a3518e
---
 docker-compose/config/postgres-init.sql | 1 +
 1 file changed, 1 insertion(+)
 create mode 100644 docker-compose/config/postgres-init.sql

(limited to 'docker-compose/config/postgres-init.sql')

diff --git a/docker-compose/config/postgres-init.sql b/docker-compose/config/postgres-init.sql
new file mode 100644
index 0000000000..0c96de5b55
--- /dev/null
+++ b/docker-compose/config/postgres-init.sql
@@ -0,0 +1 @@
+ALTER SYSTEM SET shared_buffers = '512MB';
-- 
cgit 

