From 2579386298fc4862a87073f8c719986925d77424 Mon Sep 17 00:00:00 2001
From: sebdet <sebastien.determe@intl.att.com>
Date: Thu, 8 Nov 2018 17:11:10 +0100
Subject: Fix DCAE status refresh

Fix the DCAE status refresh that was not done during the loading of the
model in Clamp

Issue-ID: CLAMP-246
Change-Id: I61ec1de74d46879ba638833bcab5143966d37228
Signed-off-by: sebdet <sebastien.determe@intl.att.com>
---
 extra/sql/bulkload/clds-create-db-objects.sql | 1 +
 1 file changed, 1 insertion(+)

(limited to 'extra/sql/bulkload/clds-create-db-objects.sql')

diff --git a/extra/sql/bulkload/clds-create-db-objects.sql b/extra/sql/bulkload/clds-create-db-objects.sql
index 38cc466f..ac64b5d7 100644
--- a/extra/sql/bulkload/clds-create-db-objects.sql
+++ b/extra/sql/bulkload/clds-create-db-objects.sql
@@ -59,6 +59,7 @@ CREATE TABLE model (
   control_name_uuid VARCHAR(36) NOT NULL,
   service_type_id VARCHAR(80) NULL,
   deployment_id VARCHAR(80) NULL,
+  deployment_status_url VARCHAR(300) NULL,
   PRIMARY KEY (model_id),
   UNIQUE (model_name),
   UNIQUE (control_name_uuid),
-- 
cgit 1.2.3-korg

