From 62e834802dae0bd15504785503060d7875c7b4ad Mon Sep 17 00:00:00 2001
From: Herbert Eiselt <herbert.eiselt@highstreet-technologies.com>
Date: Thu, 28 Mar 2019 19:00:35 +0100
Subject: Add SDN-R odlux performance

A UI displaying performance monitoring data

Change-Id: I2a9c28549aee1bcac366354c343a63f884bf09e0
Issue-ID: SDNC-585
Signed-off-by: Herbert Eiselt <herbert.eiselt@highstreet-technologies.com>
---
 sdnr/wt/odlux/framework/src/components/titleBar.tsx | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'sdnr/wt/odlux/framework/src/components/titleBar.tsx')

diff --git a/sdnr/wt/odlux/framework/src/components/titleBar.tsx b/sdnr/wt/odlux/framework/src/components/titleBar.tsx
index 439e9bc12..a3ba571ec 100644
--- a/sdnr/wt/odlux/framework/src/components/titleBar.tsx
+++ b/sdnr/wt/odlux/framework/src/components/titleBar.tsx
@@ -32,7 +32,8 @@ const styles = (theme: Theme) => createStyles({
     marginRight: 20,
   },
   icon: {
-    marginRight: 12
+    marginLeft: 16,
+    marginRight: 8
   }
 });
 
-- 
cgit 1.2.3-korg

