From 7152b77370d1989e4429ce37ec25b1e1baace0da Mon Sep 17 00:00:00 2001
From: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Date: Tue, 6 Jul 2021 16:01:10 +0200
Subject: Add dashboard to odlux

Add connected element and fault info to home page

Issue-ID: CCSDK-3238
Signed-off-by: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Change-Id: Ia47442fd0877b721d25d9f97e3a19088df193439
---
 sdnr/wt/odlux/framework/src/app.tsx | 10 ----------
 1 file changed, 10 deletions(-)

(limited to 'sdnr/wt/odlux/framework/src/app.tsx')

diff --git a/sdnr/wt/odlux/framework/src/app.tsx b/sdnr/wt/odlux/framework/src/app.tsx
index 2d913be1b..7e162cd51 100644
--- a/sdnr/wt/odlux/framework/src/app.tsx
+++ b/sdnr/wt/odlux/framework/src/app.tsx
@@ -106,13 +106,3 @@ export const runApplication = () => {
 
 };
 
-if (process.env.NODE_ENV === "development") {
-  const addTransportPCEUrl = () =>{
-    const url = window.localStorage.getItem(transportPCEUrl);
-    if(url === null){
-        window.localStorage.setItem(transportPCEUrl, "http://10.20.6.32:18082/");
-        console.log("set transport url :D")
-    }
-  }
-  addTransportPCEUrl();
-}
-- 
cgit 1.2.3-korg

