From 96d32fbfa1c0dcda85db3d06edaff36267023cfa Mon Sep 17 00:00:00 2001
From: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Date: Tue, 3 Aug 2021 11:08:00 +0200
Subject: Add aria-labels to odlux tables

Add aria-labels to all table action buttons

Issue-ID: CCSDK-3396
Signed-off-by: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Change-Id: I1c3922c1d195727265882d3e3362607ab558d603
---
 .../performanceHistoryApp/src/views/performanceHistoryApplication.tsx   | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'sdnr/wt/odlux/apps/performanceHistoryApp/src/views/performanceHistoryApplication.tsx')

diff --git a/sdnr/wt/odlux/apps/performanceHistoryApp/src/views/performanceHistoryApplication.tsx b/sdnr/wt/odlux/apps/performanceHistoryApp/src/views/performanceHistoryApplication.tsx
index a0df93fe1..b0fd54c42 100644
--- a/sdnr/wt/odlux/apps/performanceHistoryApp/src/views/performanceHistoryApplication.tsx
+++ b/sdnr/wt/odlux/apps/performanceHistoryApp/src/views/performanceHistoryApplication.tsx
@@ -251,7 +251,7 @@ class PerformanceHistoryComponent extends React.Component<PerformanceHistoryComp
                   <Tab label="Transmission Power" value="TransmissionPower" aria-label="transmission-power" />
                   <Tab label="Adaptive Modulation" value="AdaptiveModulation" aria-label="adaptive-modulation" />
                   <Tab label="Temperature" value="Temperature" aria-label="temperature"  />
-                  <Tab label="Signal-to-interference-plus-noise ratio (SINR)" value="SINR" aria-label="snir" />
+                  <Tab label="Signal-to-interference-plus-noise ratio (SINR)" value="SINR" aria-label="sinr" />
                   <Tab label="Cross Polar Discrimination" value="CPD" aria-label="cross-polar-discrimination" />
                 </Tabs>
               </AppBar>
-- 
cgit 1.2.3-korg

