From a2041a822f0406742edbd7a1074a73f9c838c0bf Mon Sep 17 00:00:00 2001
From: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Date: Fri, 21 Feb 2020 12:45:38 +0100
Subject: Update odlux

Update performance app: fix scrolling bug, reduce loading times, update ui to use tabs instead of panels, change the view to toggle between chart and table to better visualize data, minior bugfixes for other apps

Issue-ID: SDNC-1080
Signed-off-by: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Change-Id: I2b5cf3a5f580f4193421bc047e5256d8e9497e6b
Signed-off-by: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
---
 sdnr/wt/odlux/apps/performanceHistoryApp/src/utils/chartUtils.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'sdnr/wt/odlux/apps/performanceHistoryApp/src/utils/chartUtils.tsx')

diff --git a/sdnr/wt/odlux/apps/performanceHistoryApp/src/utils/chartUtils.tsx b/sdnr/wt/odlux/apps/performanceHistoryApp/src/utils/chartUtils.tsx
index 3240f73f1..f58638e30 100644
--- a/sdnr/wt/odlux/apps/performanceHistoryApp/src/utils/chartUtils.tsx
+++ b/sdnr/wt/odlux/apps/performanceHistoryApp/src/utils/chartUtils.tsx
@@ -22,7 +22,7 @@ import * as moment from 'moment';
 import { ITimeStamp } from 'models/chartTypes';
 
 const style: React.CSSProperties = {
-  height: "350px"
+  height: "80%"
 }
 export const lineChart = (chartPagedData: IDataSetsObject) => {
   return (
-- 
cgit 1.2.3-korg

