From 62e834802dae0bd15504785503060d7875c7b4ad Mon Sep 17 00:00:00 2001
From: Herbert Eiselt <herbert.eiselt@highstreet-technologies.com>
Date: Thu, 28 Mar 2019 19:00:35 +0100
Subject: Add SDN-R odlux performance

A UI displaying performance monitoring data

Change-Id: I2a9c28549aee1bcac366354c343a63f884bf09e0
Issue-ID: SDNC-585
Signed-off-by: Herbert Eiselt <herbert.eiselt@highstreet-technologies.com>
---
 sdnr/wt/odlux/apps/maintenanceApp/src/plugin.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'sdnr/wt/odlux/apps/maintenanceApp/src/plugin.tsx')

diff --git a/sdnr/wt/odlux/apps/maintenanceApp/src/plugin.tsx b/sdnr/wt/odlux/apps/maintenanceApp/src/plugin.tsx
index 19e188ec2..f23a875e3 100644
--- a/sdnr/wt/odlux/apps/maintenanceApp/src/plugin.tsx
+++ b/sdnr/wt/odlux/apps/maintenanceApp/src/plugin.tsx
@@ -16,11 +16,11 @@ const App : React.SFC = (props) => {
 
 export function register() {
   applicationManager.registerApplication({
-    name: "maintenanceApp",
+    name: "maintenance",
     icon: faLock,
     rootComponent: App,
     rootActionHandler: maintenanceAppRootHandler,
-    menuEntry: "Maintenance App"
+    menuEntry: "Maintenance"
   });
 }
 
-- 
cgit 1.2.3-korg

