From 0b7b69385f71c353510987d9e6045691fcba8afa Mon Sep 17 00:00:00 2001
From: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Date: Thu, 3 Sep 2020 15:54:52 +0200
Subject: Update LinkCalculator

update linkCalculator with latest changes

Issue-ID: CCSDK-2714
Signed-off-by: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Change-Id: Ie921da17f46a5e13e08a17d6433c80f7213220f2
---
 sdnr/wt/odlux/apps/linkCalculationApp/src/components/connectionInfo.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'sdnr/wt/odlux/apps/linkCalculationApp/src/components/connectionInfo.tsx')

diff --git a/sdnr/wt/odlux/apps/linkCalculationApp/src/components/connectionInfo.tsx b/sdnr/wt/odlux/apps/linkCalculationApp/src/components/connectionInfo.tsx
index c798e481f..cae6fbd9e 100644
--- a/sdnr/wt/odlux/apps/linkCalculationApp/src/components/connectionInfo.tsx
+++ b/sdnr/wt/odlux/apps/linkCalculationApp/src/components/connectionInfo.tsx
@@ -30,7 +30,7 @@ type props = Connect<typeof mapStateToProps, typeof mapDispatchToProps>;
 const ConnectionInfo: React.FunctionComponent<props> = (props) => {
 
     return (
-        (props.isCalculationServerReachable === false)?  <Paper style={{padding:5, position: 'absolute', top: 160, width: 230, left:"40%"}}>
+        (props.isCalculationServerReachable === false)?  <Paper style={{padding:5, width: 230, position:"absolute", top:"40%", left:"40%"}}>
         <div style={{display: 'flex', flexDirection: 'column'}}>
         <div style={{'alignSelf': 'center', marginBottom:5}}> <Typography> <FontAwesomeIcon icon={faExclamationTriangle} /> Connection Error</Typography></div>
         {props.isCalculationServerReachable === false && <Typography> Calculation data can't be loaded.</Typography>}
-- 
cgit 1.2.3-korg

