From a2b6dd34d73bf432846dc59c6f57dd59a03aff9b Mon Sep 17 00:00:00 2001
From: Michael Dürre <michael.duerre@highstreet-technologies.com>
Date: Thu, 8 Sep 2022 09:45:06 +0200
Subject: update odlux sources
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

update basic odlux functionality for kohn

Issue-ID: CCSDK-3765
Signed-off-by: Michael Dürre <michael.duerre@highstreet-technologies.com>
Change-Id: I3723c9c2f35b9012ba537920b294a54bb556cbc6
Signed-off-by: Michael Dürre <michael.duerre@highstreet-technologies.com>
---
 sdnr/wt/odlux/apps/faultApp/src/pluginFault.tsx | 7 +++++--
 1 file changed, 5 insertions(+), 2 deletions(-)

(limited to 'sdnr/wt/odlux/apps/faultApp/src/pluginFault.tsx')

diff --git a/sdnr/wt/odlux/apps/faultApp/src/pluginFault.tsx b/sdnr/wt/odlux/apps/faultApp/src/pluginFault.tsx
index 0c5fdde27..ff901b097 100644
--- a/sdnr/wt/odlux/apps/faultApp/src/pluginFault.tsx
+++ b/sdnr/wt/odlux/apps/faultApp/src/pluginFault.tsx
@@ -41,6 +41,8 @@ import { createCurrentProblemsProperties, createCurrentProblemsActions, currentP
 import { FaultStatus } from "./components/faultStatus";
 import { refreshFaultStatusAsyncAction, SetFaultStatusAction } from "./actions/statusActions";
 
+import DashboardHome from "./components/dashboardHome";
+
 let currentMountId: string | undefined = undefined;
 let currentSeverity: string | undefined = undefined;
 let refreshInterval: ReturnType<typeof window.setInterval> | null = null;
@@ -113,6 +115,7 @@ export function register() {
     rootComponent: App,
     rootActionHandler: faultAppRootHandler,
     statusBarElement: FaultStatus,
+    dashbaordElement: DashboardHome,
     menuEntry: "Fault"
   });
 
@@ -149,14 +152,14 @@ export function register() {
   applicationApi.logoutEvent.addHandler(e=>{
 
     applicationApi.applicationStoreInitialized.then(store => {
-      store.dispatch(new SetFaultStatusAction(0, 0, 0, 0, false));
+      store.dispatch(new SetFaultStatusAction(0, 0, 0, 0, false, 0, 0, 0, 0, 0, 0, 0, 0, false));
       clearInterval(refreshInterval!);
     });
   })
   
  
 
-  function startRefreshInterval(){
+  function startRefreshInterval()  {
     const refreshFaultStatus = window.setInterval(() => {
       applicationApi.applicationStoreInitialized.then(store => {
   
-- 
cgit 1.2.3-korg

