From 1a868116614dd9996c78e69941b537e9da19460b Mon Sep 17 00:00:00 2001
From: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Date: Tue, 1 Feb 2022 13:18:42 +0100
Subject: Update ODLUX

Updated to Material-ui 5, updated dashboard view, removed NetworkMap, LinkCalculator and LineOfSightApp, small bugfixes

Issue-ID: CCSDK-3580
Signed-off-by: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Change-Id: Id0fc148673e23a755cafc2be1c489248c38ff47c
---
 sdnr/wt/odlux/apps/eventLogApp/src/views/eventLog.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'sdnr/wt/odlux/apps/eventLogApp/src/views/eventLog.tsx')

diff --git a/sdnr/wt/odlux/apps/eventLogApp/src/views/eventLog.tsx b/sdnr/wt/odlux/apps/eventLogApp/src/views/eventLog.tsx
index 0308828c9..1fc53f284 100644
--- a/sdnr/wt/odlux/apps/eventLogApp/src/views/eventLog.tsx
+++ b/sdnr/wt/odlux/apps/eventLogApp/src/views/eventLog.tsx
@@ -19,7 +19,7 @@ import * as React from "react";
 
 import { Connect, connect, IDispatcher } from '../../../../framework/src/flux/connect';
 import { MaterialTable, MaterialTableCtorType } from '../../../../framework/src/components/material-table';
-import Refresh from '@material-ui/icons/Refresh';
+import Refresh from '@mui/icons-material/Refresh';
 
 import { EventLogType } from '../models/eventLogType';
 import { IApplicationStoreState } from "../../../../framework/src/store/applicationStore";
-- 
cgit 1.2.3-korg

