From ce78a6683ab8648ed90e944cd23ed7c01205fce6 Mon Sep 17 00:00:00 2001
From: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Date: Fri, 13 Mar 2020 10:39:11 +0100
Subject: Fix odlux bugs

Fix help and about app not scrollable

Fix filter hiding and showing without user interaction and default sort  in all tables

Issue-ID: SDNC-1117
Signed-off-by: Aijana Schumann <aijana.schumann@highstreet-technologies.com>
Change-Id: I5c6ff86c73a3b222a8d9022125454788496f6399
---
 sdnr/wt/odlux/apps/connectApp/src/views/connectView.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'sdnr/wt/odlux/apps/connectApp/src/views/connectView.tsx')

diff --git a/sdnr/wt/odlux/apps/connectApp/src/views/connectView.tsx b/sdnr/wt/odlux/apps/connectApp/src/views/connectView.tsx
index a96d3d635..a7feae923 100644
--- a/sdnr/wt/odlux/apps/connectApp/src/views/connectView.tsx
+++ b/sdnr/wt/odlux/apps/connectApp/src/views/connectView.tsx
@@ -61,8 +61,8 @@ class ConnectApplicationComponent extends React.Component<ConnectApplicationComp
     if (this.props.panelId === null) { //don't change tabs, if one is selected already
       this.onTogglePanel("NetworkElements");
     }
-    this.props.networkElementsActions.onToggleFilter();
-    this.props.connectionStatusLogActions.onToggleFilter();
+    //this.props.networkElementsActions.onToggleFilter();
+    //this.props.connectionStatusLogActions.onToggleFilter();
   }
 
   public componentDidUpdate = async () => {
-- 
cgit 1.2.3-korg

