From 7446f23b3abc30d7c53f2eaa951742371c071171 Mon Sep 17 00:00:00 2001
From: Herbert Eiselt <herbert.eiselt@highstreet-technologies.com>
Date: Thu, 28 Feb 2019 15:23:42 +0100
Subject: UX extensions

UX Maintenance client and further changes

Change-Id: I7643661d17db5fc3d3f94b58cb42ed0be558c64f
Issue-ID: SDNC-583
Signed-off-by: Herbert Eiselt <herbert.eiselt@highstreet-technologies.com>
---
 sdnr/wt/odlux/apps/connectApp/src/handlers/connectAppRootHandler.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'sdnr/wt/odlux/apps/connectApp/src/handlers/connectAppRootHandler.tsx')

diff --git a/sdnr/wt/odlux/apps/connectApp/src/handlers/connectAppRootHandler.tsx b/sdnr/wt/odlux/apps/connectApp/src/handlers/connectAppRootHandler.tsx
index 26d02c4e9..dd9e3e1df 100644
--- a/sdnr/wt/odlux/apps/connectApp/src/handlers/connectAppRootHandler.tsx
+++ b/sdnr/wt/odlux/apps/connectApp/src/handlers/connectAppRootHandler.tsx
@@ -4,7 +4,6 @@ import { IMountedNetworkElementsState, mountedNetworkElementsActionHandler } fro
 import { IConnectionStatusLogState, connectionStatusLogActionHandler } from './connectionStatusLogHandler';
 
 export interface IConnectAppStoreState {
-
   requiredNetworkElements: IRequiredNetworkElementsState;
   mountedNetworkElements: IMountedNetworkElementsState;
   connectionStatusLog: IConnectionStatusLogState;
-- 
cgit 1.2.3-korg

