From 0b2b11bad1457e7f388ab2a99af6ebf231e862e3 Mon Sep 17 00:00:00 2001
From: Steve Thomas <steventh@amdocs.com>
Date: Thu, 29 Mar 2018 14:41:43 -0400
Subject: increasing test coverage to 10%

Issue-ID: AAI-980
Change-Id: Idb816df11fa14b5668349f24bac1aafd7235e00a
Signed-off-by: Steven Thomas <steve.thomas@amdocs.com>
---
 src/utils/SpinnerContainer.jsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'src/utils/SpinnerContainer.jsx')

diff --git a/src/utils/SpinnerContainer.jsx b/src/utils/SpinnerContainer.jsx
index d787554..1c8b1cd 100644
--- a/src/utils/SpinnerContainer.jsx
+++ b/src/utils/SpinnerContainer.jsx
@@ -47,4 +47,3 @@ SpinnerContainer.propTypes = {
 SpinnerContainer.defaultProps = {
   loading: false
 };
-
-- 
cgit 1.2.3-korg

